0 5 10 15 20

AA R

0.5

1 20-40%

)c (GeV/ Tp 0 5 10 15 20

0.5

1 40-60%

0 5 10 15 20

0.5

1 60-80%

0 5 10 15 20

0.5

1 0-10%

0 5 10 15 20

0.5

1 10-20% ALICE = 5.02 TeV NNs Pb-Pb _- π + ^+π_- + K +K p p + _0 K* ϕ

ALI-PUB-530683

ALI-PUB-530683